
		BLOCK FILL Command

	The BLOCK FILL Command is used to fill a block of M68332EVS
memory with a user defined data pattern. Only RAM memory may be
filled.

	Upon invocation, this command request a starting and ending
address for a block of memory to me filled. You must enter a valid hex-
decimal number for both requests. This command then prompts you for a
data pattern to be used to fill memory. Any one to eight digit hex-
decimal number is acceptable. This allows memory to be filled with
byte, word, or long-word data. This command does not check for word
or long-word alignment on even addresses but will simply do as you
instruct it.

%END

